\input epsf
\hoffset=-0.56cm
\voffset=-0.56cm
\hsize=17cm
\vsize=25.7cm
\vfill
\line{\hss\epsfbox{papiers.1}\hss}
\vfill
\eject
\vfill
\line{\hss\epsfbox{papiers.2}\hss}
\bye